29.5 30 30.5 31 31.5 32

1.4

1.6

1.8

25 26 27 28

1.4

1.6

1.8

29.5 30 30.5 31 31.5 32 25

26

27

28

0 0.5 1 1.5 2 2.5

1.4

1.6

1.8